import { graphql } from "@/gql";
import { type HorizontalRuleBlockFragment } from "@/gql/graphql";
import { Image } from "@/components/general/Image";
import styles from "./horizontalRuleBlock.module.scss";

const HorizontalRuleBlockFragmentDefinition = graphql(`
  fragment HorizontalRuleBlock on HorizontalRuleBlock {
    color
  }
`);

export const HorizontalRuleBlock = ({
  block,
}: {
  block: HorizontalRuleBlockFragment;
}) => {
  const knownColors = [
    "deepBrick",
    "neufPink",
    "goldenOrange",
    "goldenBeige",
    "chateauBlue",
  ];
  const defaultColor = "chateauBlue";
  const color =
    typeof block?.color === "string" && knownColors.includes(block.color)
      ? block.color
      : defaultColor;

  return (
    <div className={styles.horizontalRuleBlock} data-color={color}>
      <svg width="3700" height="87" viewBox="0 0 3700 87" fill="none" xmlns="http://www.w3.org/2000/svg">
        <g clipPath="url(#clip0_94_2915)">
        <path d="M1923.93 5.63334C1923.9 4.99704 1923.7 4.43779 1923.45 3.97554C1923.2 3.5133 1922.9 3.11954 1922.56 2.78284C1921.9 2.11231 1921.15 1.61582 1920.28 1.26201C1919.42 0.928166 1918.61 0.785498 1917.81 0.688484C1917.01 0.594324 1916.23 0.56579 1915.47 0.571497C1914.56 0.577204 1913.66 0.628564 1912.78 0.711311C1911.89 0.791205 1911.01 0.899632 1910.15 1.02518C1908.4 1.27342 1906.69 1.593 1904.98 1.9354C1900.99 2.74004 1897.09 3.72445 1893.19 4.85438C1889.2 6.02996 1885.53 7.8504 1881.88 9.18291C1880.8 9.56811 1879.74 9.88484 1878.65 10.1759C1878.07 10.33 1876.83 10.7465 1875.8 10.8578C1875.02 10.2387 1874.21 9.65371 1873.38 9.11443C1871.37 7.81615 1869.26 6.67481 1867.01 5.86732C1864.83 5.07694 1862.57 4.52909 1860.3 4.16672C1859.73 4.08683 1859.16 3.9841 1858.59 3.92704L1856.88 3.75298C1856.31 3.70733 1855.74 3.68736 1855.17 3.65312C1854.6 3.61032 1854.02 3.61032 1853.45 3.60461C1850.73 3.57893 1848.02 3.83288 1845.34 4.28656C1842.21 4.82299 1839.14 5.70753 1836.22 6.99724C1833.93 8.00733 1831.73 9.27707 1829.71 10.8093C1829.53 10.9491 1828.56 10.7494 1828.3 10.738C1827.77 10.7123 1827.25 10.6838 1826.72 10.6353C1825.75 10.5497 1824.81 10.3642 1823.86 10.1359C1821.97 9.67939 1820.17 8.96891 1818.38 8.25557C1816.42 7.47946 1814.28 7.0001 1812.24 6.50932C1807.06 5.26526 1801.7 4.53195 1796.39 4.22664C1793.99 4.09824 1791.56 4.05544 1789.04 4.44635C1788.41 4.56048 1787.78 4.68318 1787.14 4.89432C1786.82 4.98563 1786.5 5.12544 1786.18 5.25385C1785.86 5.41078 1785.53 5.56771 1785.22 5.77316C1784.61 6.18118 1784.08 6.66911 1783.62 7.2569C1783.39 7.55935 1783.18 7.87322 1783.01 8.2413C1782.83 8.59797 1782.7 9.00886 1782.64 9.45969C1782.61 9.65086 1782.59 9.84203 1782.61 10.0475C1782.61 10.1473 1782.61 10.2501 1782.63 10.3499C1782.64 10.4527 1782.66 10.5554 1782.69 10.6552C1782.72 10.8607 1782.81 11.0519 1782.88 11.2459C1782.97 11.4342 1783.08 11.6026 1783.18 11.7766C1783.43 12.1219 1783.77 12.4101 1784.11 12.5955C1784.45 12.7867 1784.77 12.8809 1785.05 12.9522C1785.33 13.0235 1785.58 13.0635 1785.8 13.1034C1786.02 13.1434 1786.22 13.1776 1786.38 13.2175C1786.54 13.2575 1786.67 13.3031 1786.75 13.3488C1786.76 13.3545 1786.76 13.3545 1786.79 13.3688L1786.85 13.4087L1786.98 13.4886L1787.24 13.6484L1787.51 13.8053L1787.75 13.9822C1787.91 14.1021 1788.08 14.2134 1788.23 14.3389C1789.47 15.3404 1790.36 16.6416 1790.91 18.1738C1791.33 19.3665 1791.59 20.6648 1791.78 22.023C1791.97 23.3783 1792.12 24.7907 1792.37 26.2317C1792.67 28.0635 1793.24 29.9353 1794.09 31.7073C1794.61 32.803 1795.29 33.8416 1796.08 34.7689C1796.27 35.0086 1796.49 35.2226 1796.7 35.4452L1797.01 35.7733C1797.12 35.8789 1797.24 35.9759 1797.35 36.0786L1797.69 36.3811L1797.85 36.5323L1798.06 36.6921C1798.2 36.8062 1798.32 36.8861 1798.44 36.9774C1798.57 37.0687 1798.69 37.1486 1798.82 37.2285C1799.8 37.8705 1800.78 38.4212 1801.78 38.9633C1802.78 39.4998 1803.79 40.0105 1804.83 40.4842C1804.98 40.5469 1805.11 40.5955 1805.25 40.6354C1805.24 40.6354 1805.24 40.6354 1805.23 40.6383C1804.14 40.8751 1803.08 41.3288 1802.15 41.985C1801.69 42.316 1801.26 42.6813 1800.87 43.0864C1800.49 43.4945 1800.14 43.9282 1799.83 44.3847C1799.22 45.2978 1798.78 46.2822 1798.44 47.2723C1798.12 48.2681 1797.9 49.2725 1797.75 50.2769C1797.46 52.2856 1797.44 54.283 1797.59 56.2518C1797.66 57.2362 1797.78 58.2149 1797.93 59.1879C1797.93 59.2307 1797.94 59.2735 1797.95 59.3191C1791.27 60.0314 1784.6 59.739 1778.16 59.8784C1777.84 59.9212 1777.85 60.8799 1778.16 60.9256C1784.83 60.7914 1791.56 60.3821 1798.35 61.4392C1798.4 61.6503 1798.44 61.8586 1798.49 62.0698C1799.34 65.8362 1800.44 69.614 1802.23 73.1265C1802.66 73.9882 1803.14 74.8214 1803.63 75.6489C1803.89 76.054 1804.14 76.4678 1804.41 76.8644C1804.69 77.2639 1804.96 77.6633 1805.23 78.0371C1806.32 79.558 1807.47 81.0874 1808.82 82.5026C1809.5 83.2103 1810.22 83.8893 1811.02 84.5085L1811.63 84.9622L1812.28 85.3845C1812.31 85.4045 1812.32 85.4159 1812.37 85.4416L1812.52 85.5186L1812.81 85.6698L1813.39 85.9751C1813.49 86.0237 1813.58 86.0836 1813.68 86.1207L1813.98 86.2262L1814.56 86.4374L1814.85 86.543L1814.92 86.5686C1814.94 86.5686 1814.96 86.5658 1814.98 86.5629L1815.09 86.5487L1815.53 86.4945L1815.74 86.4659C1815.82 86.4545 1815.89 86.4545 1815.95 86.4146C1816.09 86.3489 1816.26 86.2262 1816.36 86.1235C1816.41 86.0779 1816.43 86.0179 1816.47 85.9552L1816.57 85.7697L1816.76 85.3988C1816.81 85.356 1816.79 85.2247 1816.8 85.1277V84.8195L1816.81 84.2004C1816.78 83.7666 1816.72 83.313 1816.68 82.8707C1816.68 82.7651 1816.65 82.631 1816.65 82.5768L1816.62 82.397L1816.57 82.0347C1816.49 81.5582 1816.4 81.0845 1816.31 80.6137C1816.2 80.0601 1816.08 79.5123 1815.95 78.973L1815.6 77.5093L1815.58 77.4237L1815.58 77.4094L1815.57 77.3809L1815.55 77.3181L1815.51 77.1754C1815.5 77.124 1815.48 77.067 1815.49 77.0128C1815.51 76.9871 1815.53 77.0156 1815.54 77.0242C1815.56 77.0385 1815.57 77.0527 1815.59 77.0698C1815.66 77.1355 1815.72 77.2239 1815.78 77.3124L1816.6 78.6335C1816.93 79.1756 1817.27 79.7292 1817.63 80.2827C1817.99 80.8363 1818.37 81.3927 1818.81 81.9434C1819.25 82.4941 1819.73 83.0248 1820.37 83.5327C1820.6 83.721 1820.87 83.8665 1821.12 84.032C1821.39 84.1519 1821.65 84.3088 1821.92 84.3801L1822.11 84.4458C1822.18 84.4686 1822.25 84.4914 1822.31 84.4914L1822.69 84.5285C1822.94 84.5399 1823.19 84.4885 1823.43 84.3887C1823.92 84.1832 1824.29 83.7895 1824.51 83.3215C1824.62 83.0847 1824.71 82.8336 1824.75 82.5397C1824.8 82.2458 1824.8 81.9319 1824.82 81.6295L1824.88 80.5738L1824.9 79.5979C1824.93 78.9445 1824.93 78.2968 1824.93 77.6491C1824.92 75.0525 1824.8 72.4702 1824.59 69.8965C1824.38 67.3228 1824.09 64.7576 1823.71 62.1982C1823.64 61.7388 1823.55 61.2765 1823.45 60.8172C1824.16 61.0369 1824.87 61.2594 1825.58 61.4877L1832.69 63.7675C1835.07 64.5151 1837.44 65.3311 1839.88 65.9617C1842.27 66.5724 1844.69 67.1059 1847.19 67.417C1847.81 67.5026 1848.46 67.5339 1849.09 67.5939C1849.41 67.6138 1849.74 67.611 1850.06 67.6195C1850.38 67.6195 1850.71 67.6424 1851.03 67.6195L1851.99 67.571L1852.46 67.5453L1852.94 67.4911L1853.9 67.3827C1854.22 67.3399 1854.53 67.2743 1854.85 67.2229C1856.35 66.9547 1857.82 66.5296 1859.22 66.0131C1860.62 65.4966 1861.95 64.9089 1863.27 64.3753C1864.8 63.7504 1866.31 63.194 1867.85 62.7803L1868.43 62.6233L1869.02 62.4921C1869.41 62.4122 1869.79 62.3095 1870.19 62.2552L1871.38 62.0584C1871.85 61.9927 1872.29 61.8957 1872.73 61.7958C1874.4 61.3878 1875.97 60.8314 1877.52 60.1894C1877.47 60.5746 1877.43 60.9627 1877.39 61.3479L1877.19 63.2625C1877.04 64.6863 1876.48 66.7436 1877.88 67.7479C1878.12 67.9134 1878.38 68.0304 1878.66 68.0846C1879.21 68.2073 1879.83 67.9505 1880.34 67.7651C1881.03 67.514 1881.66 67.1516 1882.31 66.8206C1882.73 66.6009 1883.15 66.3726 1883.57 66.1386C1884.41 65.6678 1885.23 65.1628 1886.03 64.6121L1886.62 64.1898L1886.97 63.9302L1887.02 63.8845C1887.05 63.8617 1887.07 63.836 1887.1 63.8103C1887.12 63.7846 1887.11 63.8274 1887.11 63.836L1887.09 63.8845C1887.09 63.9045 1887.09 63.9244 1887.09 63.9473V63.9787L1887.07 64.2041C1887 65.0544 1886.97 65.9218 1887.04 66.8377C1887.06 67.2001 1887.11 67.5767 1887.19 67.9705C1887.23 68.1674 1887.29 68.3728 1887.35 68.5783C1887.39 68.6838 1887.43 68.7923 1887.47 68.9007C1887.52 69.0091 1887.59 69.1546 1887.65 69.2773C1887.94 69.8081 1888.39 70.276 1888.95 70.5043C1889.51 70.7383 1890.15 70.744 1890.73 70.5927C1890.85 70.5556 1890.98 70.5157 1891.1 70.4729C1891.23 70.4301 1891.31 70.3844 1891.41 70.3388C1891.62 70.2503 1891.78 70.1476 1891.96 70.0477C1892.14 69.9479 1892.28 69.8366 1892.44 69.731C1892.6 69.6254 1892.71 69.5341 1892.85 69.4371C1893.38 69.0519 1893.91 68.6525 1894.42 68.2473C1896.49 66.6123 1898.48 64.8004 1900.13 62.6319C1900.39 62.2923 1900.71 61.8329 1900.96 61.4534C1908.55 60.4991 1915.04 60.6745 1922.26 60.9256C1922.61 60.8771 1922.63 59.8898 1922.26 59.8385C1915.09 59.6221 1908.9 59.739 1902.2 59.282C1902.67 58.2891 1903.05 57.2647 1903.34 56.229C1903.99 53.9349 1904.26 51.6151 1904.45 49.3467L1904.63 47.0412L1904.65 46.7244C1904.66 46.6132 1904.66 46.4962 1904.66 46.382C1904.66 46.1509 1904.65 45.917 1904.63 45.683C1904.59 45.2122 1904.5 44.73 1904.35 44.262C1904.06 43.3204 1903.5 42.4558 1902.88 41.7967C1902.84 41.7568 1902.8 41.7225 1902.76 41.6854C1902.85 41.6455 1902.94 41.6027 1903.03 41.557L1903.58 41.286C1904.31 40.9065 1905.02 40.4956 1905.7 40.0162C1907.05 39.0661 1908.29 37.8905 1909.27 36.5323C1910.24 35.2083 1910.99 33.7417 1911.54 32.2408C1912.09 30.7371 1912.47 29.202 1912.75 27.6755C1913.3 24.6224 1913.48 21.5978 1913.87 18.7102C1914.07 17.2722 1914.35 15.8655 1914.79 14.5843C1915.23 13.306 1915.85 12.1732 1916.7 11.3201C1917.52 10.484 1918.59 9.92193 1919.82 9.57953C1920.14 9.48822 1920.51 9.39406 1920.92 9.26566C1921.32 9.13726 1921.76 8.97747 1922.22 8.69784C1922.45 8.56373 1922.69 8.38397 1922.9 8.17853C1923.12 7.96168 1923.33 7.71914 1923.49 7.44237C1923.8 6.90308 1923.97 6.25252 1923.94 5.61622L1923.93 5.63334ZM1822.19 78.9844L1822.17 80.1914C1822.17 80.394 1822.16 80.5937 1822.14 80.7935L1822.11 81.3299C1822.12 81.3641 1822.11 81.424 1822.06 81.4098C1822.05 81.4041 1822.03 81.3955 1822.01 81.3841C1822.01 81.3841 1822.01 81.3784 1822 81.3755L1821.92 81.3099C1821.86 81.2643 1821.8 81.2043 1821.74 81.1501C1821.61 81.0417 1821.5 80.9219 1821.38 80.7935C1820.9 80.2884 1820.45 79.6721 1820.02 79.0215C1819.58 78.371 1819.16 77.6805 1818.73 76.9814L1818.4 76.4535L1818.02 75.8429L1817.75 75.4349L1817.42 74.9412C1817.2 74.6103 1816.97 74.3021 1816.74 73.9882C1816.51 73.7 1816.28 73.3833 1816.06 73.1379C1815.94 73.0095 1815.83 72.8697 1815.72 72.7499L1815.38 72.4046C1815.27 72.2819 1815.16 72.1935 1815.05 72.0936L1814.89 71.9481C1814.84 71.8967 1814.78 71.8482 1814.74 71.8254L1814.44 71.6399C1814.39 71.6028 1814.34 71.5857 1814.3 71.5714L1814.17 71.5229L1814 71.463L1813.86 71.4402C1813.76 71.423 1813.66 71.4088 1813.57 71.4173C1813.48 71.4202 1813.4 71.4174 1813.31 71.4345C1813.22 71.4487 1813.1 71.4801 1812.94 71.56C1812.8 71.6342 1812.73 71.697 1812.66 71.7569C1812.6 71.8168 1812.54 71.8824 1812.49 71.9452C1812.44 72.0108 1812.39 72.0793 1812.35 72.1592C1812.31 72.242 1812.26 72.3047 1812.23 72.4446L1812.14 72.8098C1812.12 72.8754 1812.1 72.9211 1812.09 73.0038L1812.1 73.2891L1812.11 73.857C1812.11 73.9426 1812.14 74.071 1812.16 74.1851L1812.21 74.5361L1812.34 75.2408L1812.48 75.9742C1812.58 76.4592 1812.7 76.9586 1812.81 77.4522L1813.44 80.1629C1813.62 80.959 1813.78 81.7465 1813.91 82.5311L1813.98 83.0048L1813.99 83.0619C1814 83.099 1814 83.1418 1814.01 83.1846C1814.02 83.2045 1814 83.2331 1813.98 83.2274L1813.92 83.2102C1813.88 83.196 1813.85 83.1874 1813.8 83.156L1813.76 83.1361L1813.75 83.1304L1813.7 83.099L1813.58 83.0219C1813.43 82.9192 1813.27 82.8222 1813.12 82.7166C1812.81 82.4941 1812.51 82.2715 1812.22 82.0204C1811.64 81.5268 1811.07 80.9875 1810.54 80.4054C1809.46 79.2469 1808.48 77.9601 1807.53 76.6304C1807.11 76.0398 1806.71 75.4748 1806.34 74.887C1805.96 74.2992 1805.6 73.7 1805.27 73.0866C1804.59 71.8625 1803.99 70.5927 1803.46 69.2887C1802.41 66.6836 1801.63 63.9501 1801.04 61.171C1801.04 61.1624 1801.03 61.151 1801.03 61.1424C1800.92 60.6288 1800.82 60.1295 1800.73 59.6273C1800.66 59.2022 1800.59 58.777 1800.53 58.3461C1800.41 57.4017 1800.32 56.4544 1800.28 55.5071C1800.2 53.6181 1800.28 51.7235 1800.64 49.9345C1800.86 48.796 1801.18 47.7003 1801.66 46.7187C1802.14 45.7343 1802.81 44.8926 1803.63 44.282C1804.67 43.5544 1805.93 43.1521 1807.27 43.1521C1808.6 43.1264 1809.98 43.4574 1811.26 44.0052C1812.93 44.7414 1814.42 45.8741 1815.64 47.2352C1816.78 48.5078 1817.66 49.9915 1818.31 51.5723C1818.98 53.1901 1819.29 54.8736 1819.72 56.5599C1819.83 56.9623 1819.92 57.3703 1820 57.7783L1820.04 57.9666L1820.26 59.0053C1820.31 59.2621 1820.36 59.516 1820.41 59.7728C1820.52 60.3406 1820.63 60.9113 1820.71 61.4848L1820.92 62.7289L1821.1 63.9787C1821.23 64.8118 1821.32 65.6479 1821.44 66.4839C1821.84 69.8309 1822.09 73.2036 1822.17 76.5619C1822.19 77.3694 1822.19 78.1769 1822.18 78.9844H1822.19ZM1901.92 46.7073L1901.89 47.2409C1901.85 47.9685 1901.8 48.6904 1901.75 49.4066C1901.52 52.2657 1901.04 55.0505 1900.03 57.513C1899.73 58.2206 1899.37 58.9025 1898.96 59.5674C1898.69 60.0182 1898.39 60.4605 1898.07 60.8885C1898.02 60.9541 1897.97 61.0197 1897.91 61.0854C1897.17 62.0469 1896.28 63.0285 1895.38 63.8845C1894.39 64.8261 1893.33 65.6992 1892.23 66.541C1891.95 66.7493 1891.68 66.9604 1891.4 67.163L1890.97 67.4712C1890.85 67.5568 1890.73 67.6367 1890.62 67.7108C1890.39 67.845 1890.14 67.9591 1890.08 67.9734C1890.06 67.9791 1890.04 67.9819 1890.02 67.9734C1890.01 67.9676 1890 67.9619 1890 67.9505C1890 67.9505 1889.99 67.9305 1889.97 67.9106L1889.92 67.7622C1889.84 67.5111 1889.77 67.1744 1889.74 66.8177C1889.64 65.8904 1889.68 64.9317 1889.76 64.0043C1889.81 63.4651 1889.89 62.9286 1890 62.4008C1890.11 61.8872 1890.29 61.3907 1890.39 60.8771C1890.46 60.4434 1890.42 60.1609 1890.36 59.9697C1890.29 59.6102 1890.05 59.1622 1889.69 59.0167C1888.69 58.6058 1887.83 59.5731 1887.19 60.2094C1886.21 61.1881 1885.08 62.0156 1883.92 62.7631C1883.3 63.1655 1882.66 63.5421 1882.01 63.8959C1881.6 64.1213 1881.18 64.3382 1880.76 64.5493L1880.13 64.8632L1879.92 64.9659L1879.9 64.9745C1879.86 64.9859 1879.83 65.0087 1879.8 64.983C1879.77 64.9631 1879.79 64.9203 1879.79 64.8917L1879.8 64.7947L1879.87 64.1527L1880 62.8687C1880.1 62.0127 1880.2 61.1595 1880.3 60.3035C1880.37 59.8014 1880.44 59.2992 1880.5 58.7998C1880.58 58.2263 1880.65 57.6528 1880.74 57.0793C1880.82 56.4658 1880.91 55.8552 1881 55.2446C1881 55.2274 1881.01 55.2103 1881.01 55.1932C1881.19 54.0461 1881.29 52.862 1881.54 51.7578C1881.77 50.7277 1881.92 49.6777 1882.13 48.6419C1882.33 47.686 1882.71 46.7929 1883.06 45.8913C1883.41 44.9896 1883.86 44.2078 1884.47 43.5144C1885.3 42.5871 1886.35 42.0022 1887.53 41.674C1887.75 41.6141 1887.96 41.5599 1888.18 41.5085C1889.5 41.1947 1890.89 41.052 1892.27 41.032C1892.95 41.0235 1893.63 41.052 1894.29 41.1205C1894.96 41.1918 1895.63 41.2974 1896.28 41.44C1896.49 41.4857 1896.69 41.5371 1896.89 41.5913C1897.97 41.8795 1898.98 42.2903 1899.83 42.861C1899.91 42.9067 1899.97 42.958 1900.04 43.0065C1900.46 43.3118 1900.83 43.6599 1901.14 44.0394C1901.48 44.4674 1901.71 44.9268 1901.83 45.4433C1901.89 45.7029 1901.92 45.974 1901.93 46.2622C1901.94 46.4049 1901.93 46.5532 1901.92 46.7016V46.7073ZM1921.24 5.82452C1921.25 5.85305 1921.23 5.87588 1921.23 5.90156C1921.22 5.92724 1921.23 5.95292 1921.21 5.9786C1921.19 6.00428 1921.18 6.03281 1921.18 6.06134C1921.16 6.08417 1921.15 6.10985 1921.13 6.13268C1921.06 6.22113 1920.97 6.31529 1920.79 6.41516C1920.45 6.61775 1919.89 6.77468 1919.24 6.94588C1918.96 7.01722 1918.65 7.12279 1918.34 7.2198C1918.04 7.33394 1917.74 7.43951 1917.44 7.58218C1916.84 7.8504 1916.27 8.17853 1915.73 8.58371C1914.66 9.37979 1913.77 10.4412 1913.16 11.5797C1912.54 12.7182 1912.13 13.9138 1911.83 15.0951C1911.53 16.2792 1911.33 17.4548 1911.17 18.6161C1910.73 21.7805 1910.49 24.8678 1909.88 27.801C1909.49 29.6643 1909.02 31.4904 1908.18 33.1225C1907.15 35.1398 1905.64 36.8433 1903.77 38.0988C1902.83 38.7465 1901.84 39.2144 1900.69 39.748L1900.34 39.9164C1899.49 39.4826 1898.62 39.1773 1897.74 38.9519C1896.72 38.6837 1895.69 38.5296 1894.67 38.4126C1893.38 38.2728 1892.1 38.27 1890.83 38.3641C1889.55 38.4697 1888.28 38.6723 1887.03 39.0347C1884.14 39.8707 1881.72 41.7882 1880.46 44.5445C1879.97 45.6145 1879.71 46.7073 1879.44 47.8458C1879.36 48.1511 1879.3 48.4564 1879.22 48.7589C1879.11 49.1355 1879.05 49.5293 1878.98 49.9174C1878.58 52.2457 1878.23 54.5854 1877.92 56.928C1876.24 57.7355 1874.49 58.426 1872.75 58.9311C1872.26 59.068 1871.77 59.1907 1871.3 59.2792L1869.7 59.5531C1869.42 59.5959 1869.15 59.653 1868.87 59.7186L1868.05 59.9041C1867.49 60.0325 1866.96 60.198 1866.41 60.3435C1864.26 60.9969 1862.21 61.8843 1860.25 62.6889C1858.99 63.2054 1857.76 63.6734 1856.5 64.0272C1854.53 64.615 1852.47 64.8889 1850.4 64.9003C1848.37 64.9003 1846.26 64.5836 1844.17 64.1613C1842.34 63.7846 1840.52 63.3024 1838.71 62.7917C1836.9 62.2638 1835.1 61.7017 1833.29 61.111C1830.84 60.3121 1828.4 59.439 1825.92 58.6315C1825.13 58.3775 1824.33 58.1407 1823.52 57.9181L1822.92 57.7498C1822.92 57.7498 1822.9 57.7441 1822.89 57.7412C1822.88 57.7156 1822.88 57.6899 1822.88 57.6642C1822.69 56.0178 1822.17 54.3857 1821.65 52.8221C1821.15 51.3412 1820.6 49.8717 1819.85 48.5021C1819.08 47.1096 1818.06 45.8941 1816.94 44.7756C1815.46 43.2947 1813.7 42.0592 1811.7 41.2774C1810.7 40.8894 1809.91 40.6268 1809.47 40.6297C1809.29 40.6297 1808.99 40.1475 1808.88 40.0219C1808.63 39.7423 1808.36 39.4855 1808.07 39.2458C1806.67 38.0959 1804.91 37.6451 1803.34 36.8033C1802.75 36.4866 1802.16 36.1585 1801.59 35.8132C1801.03 35.4708 1800.46 35.1142 1799.96 34.7546L1799.78 34.6234L1799.63 34.5035C1799.53 34.4237 1799.41 34.2981 1799.3 34.1982L1798.96 33.8815C1798.84 33.7759 1798.75 33.659 1798.64 33.5477L1798.33 33.211L1798.04 32.8543C1797.94 32.7345 1797.84 32.6203 1797.75 32.4976L1797.48 32.1239C1796.09 30.175 1795.44 27.7554 1795.02 25.1731C1794.81 23.8777 1794.65 22.5423 1794.42 21.167C1794.18 19.7945 1793.89 18.3764 1793.33 16.9811C1793.07 16.282 1792.71 15.603 1792.32 14.941C1791.9 14.299 1791.44 13.6655 1790.9 13.1205C1790.76 12.9836 1790.64 12.8352 1790.49 12.7097L1790.06 12.3302L1789.85 12.1418L1789.62 11.9706L1789.16 11.6339C1788.85 11.4114 1788.53 11.2345 1788.21 11.0347L1788.08 10.9605L1787.9 10.8692C1787.77 10.8036 1787.66 10.7608 1787.54 10.7152C1787.3 10.6296 1787.08 10.5725 1786.87 10.5268C1786.36 10.4184 1785.93 10.3699 1785.66 10.2986C1785.53 10.2643 1785.44 10.2301 1785.42 10.213C1785.39 10.193 1785.4 10.2016 1785.39 10.2016C1785.36 10.1302 1785.32 10.0846 1785.32 10.0189C1785.3 9.99326 1785.32 9.94761 1785.3 9.91051C1785.31 9.86201 1785.3 9.81921 1785.32 9.75929C1785.37 9.52817 1785.52 9.20003 1785.76 8.89472C1786 8.58941 1786.31 8.30122 1786.64 8.07296C1786.95 7.84754 1787.35 7.68205 1787.77 7.52226C1788.64 7.22836 1789.64 7.05716 1790.66 6.9573C1791.69 6.86028 1792.74 6.83175 1793.8 6.84316C1796.81 6.88026 1799.86 7.1713 1802.9 7.60501C1807.65 8.2784 1812.39 8.9575 1816.88 10.6724C1819.12 11.5255 1821.33 12.4614 1823.65 13.0435C1824.21 13.1833 1824.78 13.2917 1825.36 13.3545C1825.65 13.3887 1825.93 13.4515 1826.22 13.4772C1826.39 13.4972 1826.55 13.5229 1826.72 13.5514C1826.68 13.5913 1826.64 13.6341 1826.6 13.6741C1826.06 14.1734 1825.56 14.7298 1825.2 15.3747C1825.03 15.6914 1824.89 16.031 1824.77 16.3705C1824.64 16.73 1824.52 17.1409 1824.61 17.5261C1824.74 18.054 1825.34 18.1738 1825.81 18.1225C1826.25 18.0711 1826.65 17.8314 1826.95 17.509C1827.98 16.4076 1828.9 15.2235 1830.04 14.2219L1830.6 13.754L1831.16 13.2832C1831.34 13.1262 1831.53 12.9665 1831.73 12.8295L1832.92 11.9735C1833.32 11.691 1833.75 11.4513 1834.17 11.1888L1834.79 10.8036L1835.44 10.4612C1835.88 10.2387 1836.31 9.99041 1836.75 9.78497C1837.62 9.39977 1838.48 8.99459 1839.38 8.68643C1840.26 8.32976 1841.18 8.07581 1842.09 7.79333C1842.54 7.66207 1843.01 7.55935 1843.47 7.44237L1844.17 7.27116C1844.4 7.2198 1844.63 7.17986 1844.87 7.1342L1846.28 6.86884L1847.7 6.67481C1848.3 6.5778 1848.91 6.54641 1849.52 6.48649C1849.82 6.46367 1850.13 6.42657 1850.43 6.40945L1851.35 6.37236C1852.32 6.30959 1853.29 6.34097 1854.26 6.34097C1854.74 6.35524 1855.23 6.38948 1855.72 6.41231L1856.45 6.4494C1856.69 6.46652 1856.93 6.49505 1857.17 6.51788C1859.12 6.66911 1861.03 7.0058 1862.91 7.46519C1864.55 7.8561 1866.14 8.42107 1867.68 9.0859C1868.06 9.2628 1868.45 9.41403 1868.82 9.61091L1869.94 10.1844L1871.02 10.815C1871.38 11.0233 1871.72 11.2687 1872.07 11.4913C1873.97 12.7496 1875.64 14.299 1877.18 15.9767C1878.14 17.0525 1879.11 18.1481 1879.93 19.3608C1880.94 20.8617 1881.83 22.4538 1882.62 24.1031C1883.41 25.758 1884.1 27.4643 1884.75 29.2163C1885.02 29.9639 1885.56 30.3605 1886.22 30.5659C1887.09 30.8341 1887.71 30.272 1887.63 29.3247C1887.59 28.9823 1887.46 28.6371 1887.33 28.3061C1887.01 27.4957 1886.62 26.7053 1886.29 25.8893C1885.41 23.6779 1884.45 21.458 1883.19 19.3779C1882.59 18.3564 1881.91 17.3777 1881.2 16.4162L1880.65 15.7114L1880.37 15.3604L1880.08 15.0209L1879.49 14.3418L1878.88 13.6855C1878.7 13.4943 1878.52 13.306 1878.33 13.1177C1881.01 12.6298 1883.44 11.6482 1885.77 10.6752C1888.26 9.61947 1890.68 8.54947 1893.15 7.73626C1894.32 7.35677 1895.57 7.0058 1896.81 6.66625C1898.04 6.32671 1899.28 6.00142 1900.53 5.69612C1903.01 5.08264 1905.51 4.52909 1908.02 4.09253C1909.61 3.81576 1911.22 3.57893 1912.81 3.4277C1914.07 3.31071 1915.32 3.24794 1916.54 3.29645C1917.14 3.33354 1917.74 3.38205 1918.29 3.49333C1918.56 3.55325 1918.84 3.61032 1919.07 3.70162C1919.33 3.77581 1919.53 3.88138 1919.76 3.99837C1920.19 4.24661 1920.6 4.57475 1920.87 4.93142C1920.95 5.01702 1920.99 5.10833 1921.06 5.19393C1921.1 5.27953 1921.15 5.36513 1921.17 5.44217C1921.23 5.5991 1921.26 5.7275 1921.24 5.82452H1921.24Z" fill="currentColor"/>
        <path d="M1828.9 32.8543C1829.07 32.7801 1829.23 32.6945 1829.4 32.5918C1829.56 32.4891 1829.73 32.3721 1829.88 32.2351C1829.98 32.1438 1830.08 32.0411 1830.18 31.9298C1830.37 31.7044 1830.55 31.4476 1830.67 31.1109C1830.76 30.8569 1830.81 30.583 1830.8 30.3091C1830.8 30.2178 1830.8 30.1265 1830.79 30.0352C1830.73 29.6557 1830.58 29.2876 1830.34 28.9794C1830.12 28.6827 1829.86 28.4601 1829.6 28.2918C1829.06 27.9465 1828.52 27.7953 1828 27.7097C1826.95 27.5585 1826 27.7297 1825.21 28.0521C1825.06 28.112 1824.92 28.1805 1824.78 28.2547C1824.37 28.4744 1824.02 28.7398 1823.75 29.0279C1823.68 29.1021 1823.61 29.1763 1823.55 29.2505C1823.51 29.3076 1823.47 29.3646 1823.43 29.4217C1823.05 29.9524 1822.97 30.4404 1822.97 30.466C1822.96 30.5031 1822.95 30.5374 1822.95 30.5716C1822.95 30.6772 1822.98 30.7799 1823.03 30.8626C1823.09 30.9768 1823.2 31.0624 1823.33 31.1166C1823.59 31.2307 1823.91 31.2165 1824.23 31.1622C1824.18 31.1737 1824.13 31.1965 1824.1 31.2307C1824.07 31.2593 1824.05 31.2964 1824.03 31.342C1824.03 31.3477 1824.03 31.3534 1824.03 31.362C1824.02 31.3877 1824.02 31.4133 1824.02 31.4447C1824.02 31.4761 1824.03 31.5075 1824.03 31.5446C1824.04 31.6188 1824.06 31.7044 1824.1 31.7957C1824.17 31.984 1824.31 32.1952 1824.51 32.3949C1824.91 32.8001 1825.56 33.1111 1826.34 33.2167C1827.11 33.3194 1828 33.248 1828.9 32.8571V32.8543Z" fill="currentColor"/>
        <path d="M1873.47 28.9566C1873.03 28.3631 1872.26 27.7754 1871.29 27.4272C1870.31 27.082 1869.14 26.9336 1867.89 27.1676C1867.27 27.2874 1866.63 27.51 1866.02 27.9123C1865.93 27.9722 1865.84 28.0407 1865.74 28.1121C1865.61 28.2148 1865.49 28.3261 1865.36 28.4516C1865.3 28.5229 1865.23 28.6 1865.17 28.6799C1864.92 28.9937 1864.7 29.3789 1864.6 29.8155C1864.55 30.0324 1864.52 30.2549 1864.52 30.4746C1864.53 30.6943 1864.55 30.9169 1864.61 31.1252C1864.71 31.5475 1864.92 31.9042 1865.15 32.2066C1865.63 32.8115 1866.22 33.1796 1866.8 33.4393C1867.99 33.9443 1869.18 33.9842 1870.19 33.7988C1870.75 33.6961 1871.25 33.5077 1871.67 33.2681C1871.92 33.1225 1872.14 32.9599 1872.32 32.7858C1872.4 32.7202 1872.46 32.6517 1872.52 32.5804C1872.77 32.3065 1872.92 32.0211 1873 31.7758C1873.04 31.6559 1873.06 31.5446 1873.07 31.4505C1873.08 31.4048 1873.08 31.362 1873.08 31.3221C1873.08 31.2821 1873.07 31.2479 1873.07 31.2194C1873.05 31.071 1872.96 31.0168 1872.86 31.0139C1873.18 31.0424 1873.5 31.0168 1873.75 30.8627C1873.81 30.8256 1873.86 30.7799 1873.91 30.7257C1873.96 30.6715 1874 30.6116 1874.02 30.546C1874.05 30.4803 1874.07 30.4061 1874.07 30.3291C1874.08 30.2521 1874.07 30.1693 1874.05 30.0894C1874.03 30.0609 1873.93 29.5359 1873.47 28.9481L1873.47 28.9566Z" fill="currentColor"/>
        <path d="M1837.04 41.2689C1835.91 40.7325 1834.39 41.5628 1833.66 43.1264C1832.93 44.6901 1833.25 46.3935 1834.38 46.9299C1835.52 47.4664 1837.03 46.636 1837.77 45.0724C1838.5 43.5088 1838.18 41.8053 1837.04 41.2689Z" fill="currentColor"/>
        <path d="M1844.9 40.333C1843.74 40.644 1843.18 42.3161 1843.65 44.068C1844.12 45.82 1845.43 46.987 1846.59 46.6731C1847.75 46.3621 1848.31 44.6872 1847.84 42.9381C1847.37 41.1861 1846.05 40.0191 1844.9 40.333Z" fill="currentColor"/>
        <path d="M1866.1 51.0644C1865.65 51.2926 1862.19 55.0477 1854.13 55.2959C1854.32 55.139 1854.5 54.9763 1854.68 54.8108C1855.97 53.5611 1856.71 52.0573 1857.12 50.4423C1857.22 50.04 1857.31 49.6291 1857.37 49.2154C1857.44 48.8017 1857.49 48.3822 1857.53 47.9599C1857.55 47.7488 1857.56 47.5376 1857.58 47.3265C1857.62 46.693 1857.63 46.0567 1857.63 45.4262C1857.66 41.1347 1856.11 37.3027 1853.16 34.3494C1849.48 30.6601 1844.79 29.3561 1841.85 29.3561C1841.82 29.3561 1841.8 29.3561 1841.77 29.3561C1838.3 29.3818 1834.36 31.2336 1831.24 34.3095C1826.32 39.1716 1823.22 48.9957 1828.72 54.711C1830.34 56.403 1832.6 57.4074 1835.82 57.8782C1837.05 58.0579 1838.22 57.7327 1839.34 57.4159C1840.19 57.1791 1840.98 56.9565 1841.74 56.9651C1842.49 56.9737 1843.11 57.4759 1843.78 57.7526C1844.55 58.0665 1845.41 58.1378 1846.23 58.2063C1847.2 58.2891 1848.15 58.3461 1849.12 58.3547C1849.28 58.3547 1849.44 58.3547 1849.62 58.3575C1849.99 58.3518 1850.37 58.349 1850.75 58.3433C1852.54 58.3005 1854.71 58.1435 1856.9 57.7155C1857.57 57.6043 1858.24 57.4131 1858.9 57.2533C1859.51 57.0564 1860.13 56.8824 1860.72 56.6455C1860.75 56.6341 1860.78 56.6227 1860.81 56.6084C1861.43 56.3859 1862.01 56.092 1862.57 55.8323C1862.71 55.761 1862.83 55.6897 1862.96 55.6183C1864.72 54.7481 1866.7 53.5839 1867.56 52.2913C1868.05 51.5666 1866.88 50.6735 1866.09 51.0729L1866.1 51.0644ZM1847.58 55.1019C1846.92 55.1875 1846.27 55.2103 1845.64 55.1761C1845.18 55.1504 1844.77 55.0762 1844.34 54.8707C1843.47 54.4513 1842.57 54.0946 1841.59 54.106C1840.56 54.1203 1839.56 54.3857 1838.58 54.6625C1837.7 54.9078 1836.87 55.1418 1836.23 55.0505C1831.71 54.3914 1828.71 52.5966 1828.74 45.974C1828.87 39.9449 1835.03 32.2608 1841.8 32.2066C1844.37 32.1866 1848.27 33.4649 1851.16 36.3668C1853.59 38.8064 1854.82 41.8481 1854.8 45.409C1854.79 47.4292 1854.74 49.632 1853.74 51.4439C1852.53 53.6153 1850.04 54.7851 1847.58 55.1019Z" fill="currentColor"/>
        </g>
        <rect width="1800" height="2" transform="translate(0 59)" fill="currentColor"/>
        <rect width="1800" height="2" transform="translate(1900 59)" fill="currentColor"/>
        <defs>
        <clipPath id="clip0_94_2915">
        <rect width="146" height="86" fill="white" transform="translate(1777.93 0.571533)"/>
        </clipPath>
        </defs>
        </svg>
    </div>
  );
};
